| < 1) labη(|_{ch}N

210^310

2R

0

0.2

0.4

0.6

0.8

1 = 5.02 TeV NNs p-Pb = 2.76 TeV NNs Pb-Pb

24_2+v^22_2v

24_2-v^22_2v = _2R c < 3.0 GeV/ Tp 0.2 <

ALICE

| < 1) labη(|_{ch}N

210^310

〉 _2 v〈 / _{2v}σ

0

0.2

0.4

0.6

0.8

1 = 5.02 TeV NNs p-Pb = 2.76 TeV NNs Pb-Pb c < 3.0 GeV/ Tp 0.2 <

distribution 2 Bessel-Gaussian assumption for v

ALICE

-1 π4/